%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hernandez-Prieto_etal2016} Hernandez-Prieto, A., Quintana, B., Martin, S., \& Domingo-Pardo, C. (2016). Study of accuracy in the position determination with SALSA, a gamma-scanning system for the characterization of segmented HPGe detectors. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{823}, 98--106.

\end{thebibliography}

\end{document}

