%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gomez-Cadenas_etal2016} Gomez-Cadenas, J. J., Benlloch-Rodriguez, J. M., \& Ferrario, P. (2016). Application of scintillating properties of liquid xenon and silicon photomultiplier technology to medical imaging. \textit{Spectroc. Acta Pt. B}, \textit{118}, 6--13.

\end{thebibliography}

\end{document}

