%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Lalovic_etal2016} Lalovic, N., Louchart, C., Michelagnoli, C., Perez-Vidal, R. M., Ralet, D., Gerl, J., et al. (2016). Performance of the AGATA gamma-ray spectrometer in the PreSPEC set-up at GSI. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{806}, 258--266.

\end{thebibliography}

\end{document}

