%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationWeiss_etal2015} n_TOF Collaboration(Weiss, C. et al), Domingo-Pardo, C., Tain, J. L., \& Tarife{\~n}o-Saldivia, A. (2015). The new vertical neutron beam line at the CERN n_TOF facility design and outlook on the performance. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{799}, 90--98.

\end{thebibliography}

\end{document}

