%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Candela-Juan_etal2015} Candela-Juan, C., Vijande, J., Garcia-Martinez, T., Niatsetski, Y., Nauta, G., Schuurman, J., et al. (2015). Comparison and uncertainty evaluation of different calibration protocols and ionization chambers for low-energy surface brachytherapy dosimetry. \textit{Med. Phys.}, \textit{42}(8), 4954--4964.

\end{thebibliography}

\end{document}

