%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cabello_etal2015} Cabello, J., Etxebeste, A., Llosa, G., \& Ziegler, S. I. (2015). Simulation study of PET detector limitations using continuous crystals. \textit{Phys. Med. Biol.}, \textit{60}(9), 3673--3694.

\end{thebibliography}

\end{document}

