%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Pujades_etal2014} Pujades, M. C., Granero, D., Vijande, J., Ballester, F., Perez-Calatayud, J., Papagiannis, P., et al. (2014). Air-kerma evaluation at the maze entrance of HDR brachytherapy facilities. \textit{J. Radiol. Prot.}, \textit{34}(4), 741--753.

\end{thebibliography}

\end{document}

