%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Rinaldi_etal2014} Rinaldi, M., Scopetta, S., Traini, M., \& Vento, V. (2014). Double parton correlations and constituent quark models: a light front approach to the valence sector. \textit{J. High Energy Phys.}, \textit{12}(12), 028--23pp.

\end{thebibliography}

\end{document}

