%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{LHCbCollaborationAaij_etal2014} LHCb Collaboration(Aaij, R. et al), Martinez-Vidal, F., Oyanguren, A., \& Ruiz Valls, P. (2014). Precision measurement of the ratio of the Lambda(0)(b) to (B)over-bar(0) lifetimes. \textit{Phys. Lett. B}, \textit{734}, 122--130.

\end{thebibliography}

\end{document}

