%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Carrio_etal2014} Carrio, F., Kim, H. Y., Moreno, P., Reed, R., Sandrock, C., Schettino, V., et al. (2014). Design of an FPGA-based embedded system for the ATLAS Tile Calorimeter front-end electronics test-bench. \textit{J. Instrum.}, \textit{9}, C03023--12pp.

\end{thebibliography}

\end{document}

