%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Granero_etal2014} Granero, D., Perez-Calatayud, J., Vijande, J., Ballester, F., \& Rivard, M. J. (2014). Limitations of the TG-43 formalism for skin high-dose-rate brachytherapy dose calculations. \textit{Med. Phys.}, \textit{41}(2), 021703--8pp.

\end{thebibliography}

\end{document}

