%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{LHCbCollaborationAaij_etal2013} LHCb Collaboration(Aaij, R. et al), Oyanguren, A., \& Ruiz Valls, P. (2013). Measurement of the effective B-S(0) -> J/psi K-S(0) lifetime. \textit{Nucl. Phys. B}, \textit{873}(2), 275--292.

\end{thebibliography}

\end{document}

