%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vijande_etal2013} Vijande, J., Granero, D., Perez-Calatayud, J., \& Ballester, F. (2013). Monte Carlo dosimetric study of the medium dose rate CSM40 source. \textit{Appl. Radiat. Isot.}, \textit{82}, 283--288.

\end{thebibliography}

\end{document}

