%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bross_etal2013} Bross, A., Wands, R., Bayes, R., Laing, A., Soler, F. J. P., Cervera-Villanueva, A., et al. (2013). Toroidal magnetized iron neutrino detector for a neutrino factory. \textit{Phys. Rev. Spec. Top.-Accel. Beams}, \textit{16}(8), 081002--16pp.

\end{thebibliography}

\end{document}

