%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Verdu-Andres_etal2013} Verdu-Andres, S., Amaldi, U., \& Faus-Golfe, A. (2013). CABOTO, a high-gradient linac for hadrontherapy. \textit{J. Radiat. Res.}, \textit{54}, 155--161.

\end{thebibliography}

\end{document}

