%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{PierreAugerCollaborationAbreu+Pastor2013} Pierre Auger Collaboration(Abreu, P. et al), \& Pastor, S. (2013). Techniques for measuring aerosol attenuation using the Central Laser Facility at the Pierre Auger Observatory. \textit{J. Instrum.}, \textit{8}, P04009--28pp.

\end{thebibliography}

\end{document}

