%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Clinthorne_etal2013} Clinthorne, N., Brzezinski, K., Chesi, E., Cochran, E., Grkovski, M., Grosicar, B., et al. (2013). Silicon as an unconventional detector in positron emission tomography. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{699}, 216--220.

\end{thebibliography}

\end{document}

