%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goel_etal2013} Goel, N., Domingo-Pardo, C., Habermann, T., Ameil, F., Engert, T., Gerl, J., et al. (2013). Characterisation of a symmetric AGATA detector using the gamma-ray imaging scanning technique. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{700}, 10--21.

\end{thebibliography}

\end{document}

