%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vilella_etal2012} Vilella, E., Alonso, O., Trenado, J., Vila, A., Casanova, R., Vos, M., et al. (2012). A test beam setup for the characterization of the Geiger-mode avalanche photodiode technology for particle tracking. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{694}, 199--204.

\end{thebibliography}

\end{document}

