%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vijande_etal2012} Vijande, J., Ballester, F., Ouhib, Z., Granero, D., Pujades-Claumarchirant, M. C., \& Perez-Calatayud, J. (2012). Dosimetry comparison between TG-43 and Monte Carlo calculations using the Freiburg flap for skin high-dose-rate brachytherapy. \textit{Brachytherapy}, \textit{11}(6), 528--535.

\end{thebibliography}

\end{document}

