%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{SciBooNECollaborationCheng_etal2011} SciBooNE Collaboration(Cheng, G. et al), Catala-Perez, J., Gomez-Cadenas, J. J., \& Sorel, M. (2011). Measurement of K(+) production cross section by 8 GeV protons using high-energy neutrino interactions in the SciBooNE detector. \textit{Phys. Rev. D}, \textit{84}(1), 012009--22pp.

\end{thebibliography}

\end{document}

