%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Miyagawa_etal2024} Miyagawa, P. S. et al, Bernabeu, P., Lacasta, C., Solaz, C., \& Soldevila, U. (2024). Analysis of the results from Quality Control tests performed on ATLAS18 Strip Sensors during on-going production. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{1064}, 169457--9pp.

\end{thebibliography}

\end{document}

