%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{ATLASCollaborationAad_etal2023} ATLAS Collaboration(Aad, G. et al), Aikot, A., Amos, K. R., Aparisi Pozo, J. A., Bailey, A. J., Bouchhar, N., et al. (2023). Combined Measurement of the Higgs Boson Mass from the H {\textrightarrow} γγ and H {\textrightarrow} ZZ* {\textrightarrow} 4l Decay Channels with the ATLAS Detector Using √s=7, 8, and 13 TeV pp Collision Data. \textit{Phys. Rev. Lett.}, \textit{131}(25), 251802--21pp.

\end{thebibliography}

\end{document}

