%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{n_TOFCollaborationTorres-Sanchez_etal2023} n_TOF Collaboration(Torres-Sanchez, P. et al), Babiano-Suarez, V., Caballero, L., Domingo-Pardo, C., Ladarescu, I., \& Tain, J. L. (2023). Measurement of the 14N(n, p) 14C cross section at the CERN n_TOF facility from subthermal energy to 800 keV. \textit{Phys. Rev. C}, \textit{107}(6), 064617--15pp.

\end{thebibliography}

\end{document}

