%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Unno_etal2023} Unno, Y. et al, Bernabeu, J., Lacasta, C., Solaz, C., \& Soldevila, U. (2023). Specifications and pre-production of n plus -in-p large-format strip sensors fabricated in 6-inch silicon wafers, ATLAS18, for the Inner Tracker of the ATLAS Detector for High-Luminosity Large Hadron Collider. \textit{J. Instrum.}, \textit{18}(3), T03008--29pp.

\end{thebibliography}

\end{document}

