%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{n_TOFCollaborationMastromarco_etal2022} n_TOF Collaboration(Mastromarco, M. et al), Domingo-Pardo, C., \& Tain, J. L. (2022). High accuracy, high resolution U-235(n,f) cross section from n_TOF (CERN) from 18 meV to 10 keV. \textit{Eur. Phys. J. A}, \textit{58}(8), 147--13pp.

\end{thebibliography}

\end{document}

