%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Monerris-Belda_etal2021} Monerris-Belda, O., Cervera Marin, R., Rodriguez Jodar, M., Diaz-Caballero, E., Alcaide Guillen, C., Petit, J., et al. (2021). High Power RF Discharge Detection Technique Based on the In-Phase and Quadrature Signals. \textit{IEEE Trans. Microw. Theory Tech.}, \textit{69}(12), 5429--5438.

\end{thebibliography}

\end{document}

