%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Hara_etal2020} Hara, K. et al, Escobar, C., Garcia, C., Lacasta, C., Mi{\~n}ano, M., \& Soldevila, U. (2020). Charge collection study with the ATLAS ITk prototype silicon strip sensors ATLAS17LS. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{983}, 164422--6pp.

\end{thebibliography}

\end{document}

