%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Studen_etal2010} Studen, A., Burdette, D., Chesi, E., Cindro, V., Clinthorne, N. H., Cochran, E., et al. (2010). Timing performance of the silicon PET insert probe. \textit{Radiat. Prot. Dosim.}, \textit{139}(1-3), 199--203.

\end{thebibliography}

\end{document}

