%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{n_TOFCollaborationAmaducci_etal2019} n_TOF Collaboration(Amaducci, S. et al), Domingo-Pardo, C., \& Tain, J. L. (2019). Measurement of the U-235(n, f) cross section relative to the Li-6(n, t) and B-10(n,alpha) standards from thermal to 170 keV neutron energy range at n_TOF. \textit{Eur. Phys. J. A}, \textit{55}(7), 120--19pp.

\end{thebibliography}

\end{document}

