%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{NEXTCollaborationMartinez-Lema_etal2018} NEXT Collaboration(Martinez-Lema, G. et al), Palmeiro, B., Botas, A., Laing, A., Renner, J., Simon, A., et al. (2018). Calibration of the NEXT-White detector using Kr-83m decays. \textit{J. Instrum.}, \textit{13}, P10014--21pp.

\end{thebibliography}

\end{document}

