%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{n_TOFCollaborationMendoza_etal2018} n_TOF Collaboration(Mendoza, E. et al), Giubrone, G., Tain, J. L., \& Tarife{\~n}o-Saldivia, A. (2018). Measurement and analysis of the Am-241 neutron capture cross section at the n_TOF facility at CERN. \textit{Phys. Rev. C}, \textit{97}(5), 054616--21pp.

\end{thebibliography}

\end{document}

