%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Gomez-Cadenas_etal2017} Gomez-Cadenas, J. J., Benlloch-Rodriguez, J. M., \& Ferrario, P. (2017). Monte Carlo study of the coincidence resolving time of a liquid xenon PET scanner, using Cherenkov radiation. \textit{J. Instrum.}, \textit{12}, P08023--13pp.

\end{thebibliography}

\end{document}

