%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Benitez_etal2016} Benitez, V. et al, Bernabeu, J., Garcia, C., Lacasta, C., Marco, R., Rodriguez, D., et al. (2016). Sensors for the End-cap prototype of the Inner Tracker in the ATLAS Detector Upgrade. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{833}, 226--232.

\end{thebibliography}

\end{document}

