%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Huyuk_etal2016} Huyuk, T. et al, Gadea, A., Aliaga-Varea, R. J., \& Domingo-Pardo, C. (2016). Conceptual design of the early implementation of the NEutron Detector Array (NEDA) with AGATA. \textit{Eur. Phys. J. A}, \textit{52}(3), 55--8pp.

\end{thebibliography}

\end{document}

