%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Barrio_etal2015} Barrio, J., Etxebeste, A., Lacasta, C., Mu{\~n}oz, E., Oliver, J. F., Solaz, C., et al. (2015). Performance of VATA64HDR16 ASIC for medical physics applications based on continuous crystals and SiPMs. \textit{J. Instrum.}, \textit{10}, P12001--12pp.

\end{thebibliography}

\end{document}

