%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Doncel_etal2015} Doncel, M., Cederwall, B., Martin, S., Quintana, B., Gadea, A., Farnea, E., et al. (2015). Conceptual design of a high resolution Ge array with tracking and imaging capabilities for the DESPEC (FAIR) experiment. \textit{J. Instrum.}, \textit{10}, P06010--15pp.

\end{thebibliography}

\end{document}

