%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Goasduff_etal2014} Goasduff, A., Valiente-Dobon, J. J., Lunardi, S., Haas, F., Gadea, A., de Angelis, G., et al. (2014). Counting rate measurements for lifetime experiments using the RDDS method with the new generation gamma-ray array AGATA. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{758}, 1--3.

\end{thebibliography}

\end{document}

