%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{AGATACollaboration_etal2011} AGATA Collaboration, Doncel, M., Quintana, B., Gadea, A., Recchia, F., \& Farnea, E. (2011). Background rejection capabilities of a Compton imaging telescope setup with a DSSD Ge planar detector and AGATA. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{648}, S131--S134.

\end{thebibliography}

\end{document}

