%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{ATLASCollaborationAad_etal2023} ATLAS Collaboration(Aad, G. et al), Amos, K. R., Aparisi Pozo, J. A., Bailey, A. J., Bouchhar, N., Cabrera Urban, S., et al. (2023). Measurement of the Higgs boson mass in the H{\textrightarrow}ZZ*{\textrightarrow}4l decay channel using 139 fb-1 of √s=13 TeV pp collisions recorded by the ATLAS detector at the LHC. \textit{Phys. Lett. B}, \textit{843}, 137880--23pp.

\end{thebibliography}

\end{document}

