%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Mandic_etal2022} Mandic, I., Cindro, V., Debevc, J., Gorisek, A., Hiti, B., Kramberger, G., et al. (2022). Study of neutron irradiation effects in Depleted CMOS detector structures. \textit{J. Instrum.}, \textit{17}(3), P03030--13pp.

\end{thebibliography}

\end{document}

