%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Cabanelas+Nacher2020} Cabanelas, P. et al, \& Nacher, E. (2020). Performance recovery of long CsI(Tl) scintillator crystals with APD-based readout. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{965}, 163845--6pp.

\end{thebibliography}

\end{document}

