%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Yokoyama_etal2019} Yokoyama, R., Singh, M., Grzywacz, R., Keeler, A., King, T. T., Agramunt, J., et al. (2019). Segmented YSO scintillation detectors as a new beta-implant detection tool for decay spectroscopy in fragmentation facilities. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{937}, 93--97.

\end{thebibliography}

\end{document}

