%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{n_TOFCollaborationMingrone_etal2017} n_TOF Collaboration(Mingrone, F. et al), Domingo-Pardo, C., Giubrone, G., \& Tain, J. L. (2017). Neutron capture cross section measurement of U-238 at the CERN n_TOF facility in the energy region from 1 eV to 700 keV. \textit{Phys. Rev. C}, \textit{95}(3), 034604--14pp.

\end{thebibliography}

\end{document}

