%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{AGATACollaboration_etal2010} AGATA Collaboration, Doncel, M., Recchia, F., Quintana, B., Gadea, A., \& Farnea, E. (2010). Experimental test of the background rejection, through imaging capability, of a highly segmented AGATA germanium detector. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{622}(3), 614--618.

\end{thebibliography}

\end{document}

