%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Clausse_etal2015} Clausse, A., Soto, L., \& Tarife{\~n}o-Saldivia, A. (2015). Influence of the Anode Length on the Neutron Emission of a 50 J Plasma Focus: Modeling and Experiment. \textit{IEEE Trans. Plasma Sci.}, \textit{43}(2), 629--636.

\end{thebibliography}

\end{document}

