%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Bertoldo_etal2021} Bertoldo, S., Maggioni, G., Raniero, W., Carraro, C., Riccetto, S., Sgarbossa, F., et al. (2021). New method for the production of thin and stable, segmented n plus contacts in HPGe detectors. \textit{Eur. Phys. J. A}, \textit{57}(6), 177--10pp.

\end{thebibliography}

\end{document}

