%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Linhart_etal2011} Linhart, V., Burdette, D., Chessi, E., Cindro, V., Clinthorne, N. H., Cochran, E., et al. (2011). Spectroscopy study of imaging devices based on silicon Pixel Array Detector coupled to VATAGP7 read-out chips. \textit{J. Instrum.}, \textit{6}, C01092--8pp.

\end{thebibliography}

\end{document}

