%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{CMSandCALICECollaborationsAcar+Irles2023} CMS and CALICE Collaborations(Acar, B. et al), \& Irles, A. (2023). Performance of the CMS High Granularity Calorimeter prototype to charged pion beams of 20-300 GeV/c. \textit{J. Instrum.}, \textit{18}(8), P08014--32pp.

\end{thebibliography}

\end{document}

