%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Latonova_etal2023} Latonova, V. et al, Bernabeu, J., Lacasta, C., Solaz, C., \& Soldevila, U. (2023). Characterization of the polysilicon resistor in silicon strip sensors for ATLAS inner tracker as a function of temperature, pre- and post-irradiation. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{1050}, 168119--5pp.

\end{thebibliography}

\end{document}

